\hypertarget{structusb__core}{
\section{usb\_\-core Struct Reference}
\label{structusb__core}\index{usb\_\-core@{usb\_\-core}}
}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structusb__core_acc78401be3e5c27fcbb879cebe7e2384}{
u8 {\bfseries nextaddress}}
\label{structusb__core_acc78401be3e5c27fcbb879cebe7e2384}

\item 
\hypertarget{structusb__core_a2e39276bca6ee2e93217d975647a1428}{
void($\ast$ {\bfseries stdout} )(char $\ast$arg)}
\label{structusb__core_a2e39276bca6ee2e93217d975647a1428}

\item 
\hypertarget{structusb__core_a411f75d9f289d614afce91d20e120a72}{
struct \hyperlink{structlist}{list} $\ast$ {\bfseries drivers}}
\label{structusb__core_a411f75d9f289d614afce91d20e120a72}

\item 
\hypertarget{structusb__core_a86b3b3fb78533bec20d30c59b309629f}{
struct \hyperlink{structlist}{list} $\ast$ {\bfseries devices}}
\label{structusb__core_a86b3b3fb78533bec20d30c59b309629f}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
libhextwelve/include/hextwelve/core/core.h\end{DoxyCompactItemize}
