\hypertarget{structusb__endpoint}{
\section{usb\_\-endpoint Struct Reference}
\label{structusb__endpoint}\index{usb\_\-endpoint@{usb\_\-endpoint}}
}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structusb__endpoint_aa41e8e0cff17375a3404876950e5c6d2}{
u8 {\bfseries type}}
\label{structusb__endpoint_aa41e8e0cff17375a3404876950e5c6d2}

\item 
\hypertarget{structusb__endpoint_a81d22a43bce5b5104c6d08d2ebce154c}{
u8 {\bfseries size}}
\label{structusb__endpoint_a81d22a43bce5b5104c6d08d2ebce154c}

\item 
\hypertarget{structusb__endpoint_a444c54667162e6c67a2e57e47581e256}{
u8 {\bfseries togl}}
\label{structusb__endpoint_a444c54667162e6c67a2e57e47581e256}

\item 
\hypertarget{structusb__endpoint_a33b0e5cd7e1c526b29dea3d68e4319c3}{
struct \hyperlink{structusb__endpoint}{usb\_\-endpoint} $\ast$ {\bfseries next}}
\label{structusb__endpoint_a33b0e5cd7e1c526b29dea3d68e4319c3}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
libhextwelve/include/hextwelve/core/core.h\end{DoxyCompactItemize}
