\hypertarget{structusb__endpoint__descriptor}{
\section{usb\_\-endpoint\_\-descriptor Struct Reference}
\label{structusb__endpoint__descriptor}\index{usb\_\-endpoint\_\-descriptor@{usb\_\-endpoint\_\-descriptor}}
}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structusb__endpoint__descriptor_a792e72235bfbb42fe487246656fb9a57}{
unsigned char {\bfseries bLength}}
\label{structusb__endpoint__descriptor_a792e72235bfbb42fe487246656fb9a57}

\item 
\hypertarget{structusb__endpoint__descriptor_afae704c07c390d6c7bc74d32b409632a}{
unsigned char {\bfseries bDescriptorType}}
\label{structusb__endpoint__descriptor_afae704c07c390d6c7bc74d32b409632a}

\item 
\hypertarget{structusb__endpoint__descriptor_a3c0136512afc100da7a3337fabf563cf}{
unsigned char {\bfseries bEndpointAddress}}
\label{structusb__endpoint__descriptor_a3c0136512afc100da7a3337fabf563cf}

\item 
\hypertarget{structusb__endpoint__descriptor_a39f8783cef8640c55ed00ce919dc26e7}{
unsigned char {\bfseries bmAttributes}}
\label{structusb__endpoint__descriptor_a39f8783cef8640c55ed00ce919dc26e7}

\item 
\hypertarget{structusb__endpoint__descriptor_adb5b164ef0da16a376fca9d342db936d}{
unsigned short {\bfseries wMaxPacketSize}}
\label{structusb__endpoint__descriptor_adb5b164ef0da16a376fca9d342db936d}

\item 
\hypertarget{structusb__endpoint__descriptor_a22ebf6e16f1fce7bfff5174724a68436}{
unsigned char {\bfseries bIntervall}}
\label{structusb__endpoint__descriptor_a22ebf6e16f1fce7bfff5174724a68436}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
libhextwelve/include/hextwelve/usbspec/usb11spec.h\end{DoxyCompactItemize}
